Gary Giangola, MD, FACS

Title: Medical Doctor
Company: Lenox Hill Hospital
Location: New York, NY United States
Notable Member

Achievements:

Inductee, Worldwide Lifetime Achievement (2015)

Inductee, Lifetime Membership, Worldwide Registry (2015)

Industry Expert, “Top Doctors: Experts in Medicine.” Who’s Who Publishers (2015)

Friend of Nursing Award, First Annual Award Recipient, Lenox Hill Hospital (2014)

Top Doctors, Castle Connolly, New York Magazine (2014, 2002-2008)

Top Doctors, New York Metro Area, Castle Connolly (2014, 2003-2009)

Past President, New York Surgical Society (2009-2010)

America’s Top Doctors, Castle Connolly (2002-2009)

Past President, New York Society for Vascular Surgery (2008-2009)

Attending of the Year Award, General Surgery Chief Residents, Department of Surgery, St. Luke’s/Roosevelt Hospital (1998)

Attending of the Year Award, General Surgical Chief Residents, Department of Surgery, New York University (1997)

Theodore Barnett Memorial Prize, Department of Surgery Preceptorship Award (1983)

President, Alpha Omega Alpha, New York University School of Medicine (1980)

Featured, Super Doctor, SuperDoctors.com

Featured, Top MD, Consumers Checkbook

Past President, Peripheral Vascular Surgery Society

Designations:

Added Qualifications in Vascular Surgery, American Board of Surgery

Certified in General Surgery, America Board of Surgery

Fellowship in Vascular Surgery, New York University Medical Center

Residency in General Surgery, New York University Medical Center

New York State Medical License

Internship in General Surgery, New York University Medical Center

MD, New York University School of Medicine

Bachelor of Arts, New York University College, with Honors

New York University College

[contact-form]